Flight Bar Help

____________________________________________________________

Inbuilt logging technique of VG108 can store flight bar parameters for specified logged tanks. If one specifies parameter, Like load% type of process, type of load rack/barrel, type of passivation at time of loading specified data’s are logged at time of lifting and lowering to all of logged tank declared in plant setting.

Upper portion of screen indicates time of load, entered into and removed from logged tank. Lower portion of screen shows its parameters at time of lifting/lowering from logged tank.

Following Menu commands & Receive Push Button are given for viewing, saving, deleting & printing.

Selecting Flight bar Number

Click [image] up or [image] down arrows to get required flight bar. One can also directly write required flight bar number.

Receive Push Button

Select flight bar. Click receive push button. Parameters of specified flight bar of all defined tanks will be fetched from PEL.

File (Menu)

Click File->Open, Delete, Print & Exit menu is displayed.

Click Open to open stored file. A stored list file is displayed. Select the file and Click ok.

Click Delete to delete one of the stored file. A stored list file is displayed. Select the file and Click ok to delete.

Click Print to print selected flight bar data.

Click Exit to close Fbstatus program.

GetAllAndLog (Menu)

Since this fetches an entire memory of flight bar log register, this takes very long time to get data hence it is recommended to get this data at end of day or when buffer full auxiliary error appeared. Click this menu to get all flight bar data of all log tanks from VG108 and to store in computer file. Computer file is saved automatically with help of computer date.