Timer/Clock Help

______________________________________________________________________

This program is meant to check status of or to change, Timer & Clock for VG108 system only. There are 48 timers, can be programmed for a tick of 0.01 second or 0.1 minute and a clock for logging purpose.

Clock status & editing:

On initialize program a current computer date & time is shown. One can also click REFRESH Push button to check fresh computer date & time. Click TRANSMITS Push button to change PEL (Programmable Escalator Logic) clock time to indicated computer clock time.

Changing Timer Number:

One can change timer number only after one has clicked REFRESH Pushbutton at least once. To change timer number, click [image] up or [image] down arrow of TIMER NUMBER to increment or decrement timer number.

Change Time of a Selected Timer:

There are 48 timers numbered 0 to 47, with each timer having a range of 0 to 99.99 seconds or 0 to 999.9 minutes range. To see status or to edit a particular timer, change timer as shown above. To edit its time, click [image] up or [image] down arrow of (1000s, 100s unit) or (10s, 1s unit) to change range. To edit its tick of 0.01 second or 0.1 minute select option, & then click TRANSMIT Push button if required to store it in VG108.To bring default time instead of transmitting then increment & decrement timer number, edited time of a timer is resetted to its default time. Remember TRANSMIT Push button disabled whenever Timer Number is incremented or decremented, it is enabled whenever time is incremented or decremented.