Error & Plant Stoppages Help

___________________________________________________________

Inbuilt logging technique of VG108 can store maximum 256 error and plant stoppages occurred in auto mode, in its built-in Error Log Register. One can view this log register and can store it to computer file. A computer file will be saved on computer calendar bases. If one tries to store number of times in one day then only last file will be stored. One should make a file every day for its log & statistics record. On screen 256 errors are organized as 16 errors per page. So that one can view 16 pages single page at a time.

Following commands are given for viewing, saving, deleting & printing.

To view stored file

To get errors from VG108

To save Error List on computer

To change Page Number

To clear Error List in VG108

To Delete File

To Print Page


To view stored file

________________________________________________________________________________

Click Open File. List of stored files will appear. Select required file and click OK button. Click on required error or it’s time or its index for error remedies.


To Get Error List from VG108

________________________________________________________________________________

Click on label Get from VG108 to get all errors from VG108 Error Log Register. Wait for some time. Click on required error or it’s time or its index for error remedies.


To Save Error List on computer

________________________________________________________________________________

First click Get from VG108 to get error list from VG108. Then click Save File to save errors of day.


To change Page Number

________________________________________________________________________________

Click Next Page to increment page number if it is not last page.

Click Previous Page to decrement page number if it isn't on first page.


To clear Error List in VG108

________________________________________________________________________________

Click Clear in VG108 to clear all errors of Error Log Register. This will clear entire register & then log time at which Error Log Register was cleared, with a remark Error Buffer Cleared.


To Delete File

________________________________________________________________________________

Click in this box to delete a file of required day. All saved files are listed; select one required file & click Oakfield will be deleted.


To Print Page Print

__________________________________________________________

Click in this box to print current page of errors. To print other pages go to that page & click Print Page.