Tank Status Help

________________________________________________________________________

Inbuilt storing technique of VG108 for a flightbar data to a tank, allows user o modify data in case they are wrongly fed at time of loading, or to restore lost data in case a data lost in certain circumstances. Each flight bar when lowered to a tank, its 8 counter (Private) type + 8 flag (Private) type memory is also loaded to that tank. Counter (Private) type data are shown on top of screen & on lower portion of screen flag (Private) type of data are shown. This program is mainly used to edit lost data. So that no saving or printing is required because data in a tank varies moment a new flightbar is lowered. One should take care that no wagon action is taking place on that tank while transmission. One should also take care while editing data because even if the load is lifted out, data of that tank does not change except TankLoaded data. TankLoaded is changed to YES if load is on tank else changed to NO. So that User should change data only when TankLoaded data is YES.

However to avoid this complication one can create EDIT input in program & allows user to change data safely.

Selecting Tank Number

Click up [image] or [image] down arrows to get required Tank number. One can also directly write required tank number. For safety precaution Transmit is disabled on changing tank numbers.

To view data of a selected tank

Select tank number for which one to view data. Click Receive push button. Data's of tank will be shown. This makes Transmit enabled. One should take care that no wagon action is taking place on that tank while receiving.

To change data of a selected tank in plant

First view data of a selected tank. Then edit data as required. Click Transmit to send data in plant. One should take care that no wagon action is taking place on that tank while transmitting.